[GeV]

T EΣ

0 100 200 300 400 500 600 700 800 900

Resolution of x-component of MET [GeV]

0 2 4 6 8 10 12 14 TE× resolution: 0.53 mis xE ggX → Events: pp

MG/ME + Pythia + Delphes

ATLAS-like detector

ATLAS Delphes